RESTORE DATABASE telus_20240112
FROM DISK = 'C:\BaseMantaGIS\TELUS\telus.bak'
WITH 
    MOVE 'telus' TO 'C:\Program Files\Microsoft SQL Server\MSSQL12.MSSQLSERVER\MSSQL\DATA\telus_20240112.mdf',
    MOVE 'telus_log' TO 'C:\Program Files\Microsoft SQL Server\MSSQL12.MSSQLSERVER\MSSQL\DATA\telus_20240112.ldf',
    REPLACE,
	STATS = 10
/*
RESTORE FILELISTONLY 
FROM DISK = 'C:\Telus_Respaldos\telus.bak';
*/